Lightweight tools for heavy metrology demands.
ZEISS XXT-Accessories – Optimized stylus systems for more accuracy in complex measuring.

Benefits at a glance.

Complexity
Extremely lightweight carbon fiber enables the use of multi-piece stylus systems.

Speed
Faster scanning at higher speed dueto high-strength, yet lightweight titanium alloy.

Accuracy
Thermally stable materials deliver accurate results in challenging production environments.

Importance of weight.

Many measuring systems define limits for the weight and length of stylus systems. Exceeding these limits may result in stylus malfunction.

!

Attention! Never exceed the permissible maximum weight. The specification in the documentation of your measuring macvhine is always binding.

More information
www.zeiss.ly/xxt-accessories

Get the right ZEISS XXT– Accessories for your demands now!
shop.metrology.zeiss.com